100100200300400500600700800900

1000 -70 -60 -50 -40 -30 -20 -10 0 10 240 250 260 270 280 290

0.1 0.2 0.4 0.6 0.8 1.0 2.0 3.0 4.0 5.0 10.0

15.0 20.0

25.0 30.0

240 250 260 270 280 290 300

(hPa)

(˚C)

0000UTC 13 JAN 1998

STATION ID : 47401 WAKKANAI

LAT: LON:

45.42˚N 141.68˚E