GMS-5 IR 04UTC 24 MAY 2000

120˚

125˚

130˚

135˚

140˚

145˚

150˚

30˚

35˚

40˚

45˚

203.78

205.35

212.46

218.68

224.24

229.31

233.97

238.32

242.40

246.24

249.89

253.37

256.70

259.89

262.96

265.93

268.79

271.57

274.26K